CREATE TABLE `tb_app_global_config`
(
    `id`                     bigint(20)   NOT NULL COMMENT '唯一标识',
    `metric_publish_url`     varchar(100)  DEFAULT NULL COMMENT 'victoria 指标服务地址',
    `metric_prometheus_url`  varchar(100)  DEFAULT NULL COMMENT '指标推送 prometheus 服务地址',
    `metric_api_url`         varchar(1000) DEFAULT NULL COMMENT 'api 推送地址',
    `metric_publish_delay`   int(11)       DEFAULT 10000 COMMENT '指标推送延迟时间',
    `metric_publish_period`  int(11)       DEFAULT 15000 COMMENT '指标推送周期',
    `metric_publish_timeout` int(11)       DEFAULT 15000 COMMENT '指标推送超时时间',
    `metric_publish_batch`   int(11)       DEFAULT 20 COMMENT '指标推送单批次指标数量',
    `checkpoint_root_path`   varchar(500) NOT NULL COMMENT 'checkpoint 信息保存路径',
    `zk_url`                 varchar(500) NOT NULL COMMENT 'zookeeper 地址',
    PRIMARY KEY (`id`)
) DEFAULT CHARSET = utf8mb4 COMMENT ='通用配置';
